\hypertarget{structtiming__thread__info}{}\section{timing\+\_\+thread\+\_\+info Struct Reference}
\label{structtiming__thread__info}\index{timing\+\_\+thread\+\_\+info@{timing\+\_\+thread\+\_\+info}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structtiming__thread__info_a022761cdcef7fdceaedcb9f51e02f72e}\label{structtiming__thread__info_a022761cdcef7fdceaedcb9f51e02f72e}} 
int {\bfseries thread\+\_\+seq\+\_\+number}
\item 
\mbox{\Hypertarget{structtiming__thread__info_ad3e659d480f4c9039ab6fff7090301f4}\label{structtiming__thread__info_ad3e659d480f4c9039ab6fff7090301f4}} 
pthread\+\_\+t {\bfseries pthread}
\end{DoxyCompactItemize}


\subsection{Detailed Description}
Struct for acting timing-\/thread information 

The documentation for this struct was generated from the following files\+:\begin{DoxyCompactItemize}
\item 
Myro\+C-\/display-\/linux-\/mac.\+c\item 
Myro\+C-\/display-\/windows-\/interface-\/manager.\+c\item 
Myro\+C-\/display-\/windows-\/opengl-\/img-\/handler.\+c\item 
Myro\+C-\/display.\+c\end{DoxyCompactItemize}
